Server Information

USER GUIDE

CONTENTS

Overview 3

Server Information 4

Server Information i

Overview

This guide contains server information and settings for your Windstream Hosting services.

iew

Overv

Server Information 3

Server Information ion

Hosted Servers

Server Info

ns1.windstreamhosting.biz ns2.windstreamhosting.biz Hosted Name Servers

ns3.windstreamhosting.biz ns4.windstreamhosting.biz 10 mx1.windstreamhosting.com Informat

100 mx2.windstreamhosting.com Hosted MX Servers

110 mx3.windstreamhosting.com 120 mx4.windstreamhosting.com Root (Ex. domain.com) 64.29.145.9

Hosted A Records

WWW (Ex. www.domain.com) 64.29.145.9

Server

Incoming Hosted Mail Server (Used to set up Outlook or other 3rd Party Email Clients) mail.windstreamhosting.com Outgoing Hosted Mail Server (Used to set up Outlook or other 3rd Party Email Clients)*

mail.windstreamhosting.com Legacy NuVox Mail Servers Server Info

Incoming Mail Server Used for nuvox.net, fdn.com, one.net pop.nuvox.net

Outgoing Mail Server Used for nuvox.net, fdn.com, one.net smtp.nuvox.net

Residential Mail Servers Server Info

Incoming Mail Server Used for windstream.net, ctc.net, valor.net pop.windstream.net

Outgoing Mail Server*

Used for windstream.net, ctc.net, valor.net smtp.windstream.net

* Outgoing Server requires Authentication Server Information 4

windstreamhosting.com 800.316.4581

© 2013 Windstream | 12.03